American Museum of Natural History Research Library
author: American Museum of Natural History

Lentelli, Leo 1879-; Lentelli, Leo
birth: 1880, 1879
death: 1962
Sculptor
Leo Lentelli was born in Bologna, Italy and died in Rome, Italy. Lentelli was an Italian painter and sculptor. He was active in New York and Italy. The American Museum of Natural History has one sculpture of Joseph Prentice Willetts, 1946. Art Survey No. 34