American Museum of Natural History Research Library
author: American Museum of Natural History

Jennings, Oliver Gould 1865-1936
birth: April 27, 1865
death: October 13, 1936
Industrialist
Director, Bethlehem Steel; Trustee of AMNH
Trustee, American Museum of Natural History.