American Museum of Natural History Research Library
author: American Museum of Natural History

Gratacap, L. P. (Louis Pope) 1851-1917
birth: November 1, 1851
death: December 19, 1917
Curator (AMNH Minerals and Gems)
Worked at the American Museum of Natural History.