American Museum of Natural History Research Library
author: American Museum of Natural History

Emerson, Alfred E. (Alfred Edwards) 1896-1976
birth: December 31, 1896
death: October 3, 1976
Research Associate (AMNH Entomology)
Alfred Edwards Emerson was the leading authority on termites. Emerson was a Research Associate at the American Museum of Natural History in the Entomology Department. In 1964, he donated the largest termite collection in the world to the AMNH
Worked at the American Museum of Natural History in American Museum of Natural History. Department of Invertebrates.