American Museum of Natural History Research Library
author: American Museum of Natural History

Eisenmann, Eugene 1906-1981
birth: February 19, 1906
death: October 16, 1981
Ornithologist
Eugene Eisenmann was a research associate in the Department of Ornithology at the American Museum of Natural History
Worked at the American Museum of Natural History in American Museum of Natural History. Department of Ornithology.