American Museum of Natural History Research Library
author: American Museum of Natural History

Cullman, Joseph F. (Joseph Frederick) 1912-2004
birth: April 9, 1912
death: April 30, 2004
Chairman of the board, Philip Morris Incorporated
Led the 1975-6 Corporate Drive, raised $380,200