American Museum of Natural History Research Library
author: American Museum of Natural History

Baker, George F.
birth: March 10, 1878
death: May 30, 1937
George F. Baker, Jr. was a banker. He was a trustee of the American Museum of Natural History, and was elected Treasurer in 1922
Trustee, American Museum of Natural History.