American Museum of Natural History Research Library
author: American Museum of Natural History

Audubon, John James, 1785-1851
birth: 1785
death: 1851
John James Audubon was a naturalist and artist, known especially for his work on birds. His The birds of America was first published 1827-1838; The viviparous quadrupeds of North America, published 1845-1853.