American Museum of Natural History Research Library
author: American Museum of Natural History

Aronson, Lester R. (Lester Ralph), 1911-1996
birth: April 9, 1911
death: April 7, 1996
See description in AMNH Archives database: https://data.library.amnh.org/archives/agents/amnhp_1000053
Lester R. Aronson was a biologist and animal behaviorist at the American Museum of Natural History (AMNH) from 1938 to 1977; curator, 1949- and chairman 1958-1977, Dept. of Animal Behavior; chairman emeritus 1977- ; he died in 1996.