American Museum of Natural History Research Library
author: American Museum of Natural History

Allgoever, Charles W.
birth: December 26, 1873
death: September 28, 1956
Charles Wilhelm Friedrich Allgoever worked at the American Museum of Natural History. He was in charge of the construction of iron work to support the globe in the Hayden Planetarium. He retired from the museum in 1936
Worked at the American Museum of Natural History in the Hayden Planetarium.