American Museum of Natural History Research Library
author: American Museum of Natural History

Adams, Charles C. (Charles Christopher), 1873-1955
birth: July 23, 1873
death: May 22, 1955
Director of New York State Museum
Director of Roosevelt Wild Life Forest Experiment Station