American Museum of Natural History Research Library
author: American Museum of Natural History

Buckminster Fuller (Exhibition)
birth: 1977 April 4
death: 1977 May 1
Exhibition. Opened April 4, 1977 and closed May 1, 1977. Located in the Center Gallery at the American Museum of Natural History. "Buckminster Fuller " was a photographic retrospective of Buckminster Fuller's designs and architectual drawings, which opened conjunction with an appearance by Buckminster Fuller entitled "An Afternoon with Buckminster Fuller."
Summary
"Buckminster Fuller " was a photographic retrospective of Buckminster Fuller's designs and architectual drawings, which opened conjunction with an appearance by Buckminster Fuller entitled "An Afternoon with Buckminster Fuller." The exhibition on view in the Center Gallery on the second floor of the American Museum of Natural History from April 4 through May 1, 1977.