American Museum of Natural History Research Library
author: American Museum of Natural History

Atomic Science (Exhibition)
birth: 1948 January
death: 1948 April 4
Exhibition. Opened January 1948 and closed April 4, 1948. Located in the Education Hall at the American Museum of Natural History. "Atomic Science" featured demonstrations, model atomic pile, movies, talks, displays, and panels.
Summary
"Atomic Science" featured demonstrations, model atomic pile, movies, talks, displays, and panels. It was sponsored by Brookhaven National Laboratory, the center for nuclear research. The exhibition was noted as popular and on view in the Education Hall at the American Museum of Natural History starting in late January and continued through April 4, 1948.
Individuals and institutions involved in the creation of the exhibition: Brookhaven National Laboratory.