American Museum of Natural History Research Library
author: American Museum of Natural History

Happy 50th Anniversary Bronx High School of Science (Exhibition)
birth: 1988 December
death: 1989 January
Exhibition. Opened in December 1988 and closed January 1989. Located in Section 12, Floor 2 in the Roosevelt Memorial Hall at the American Museum of Natural History. "Happy 50th Anniversary Bronx High School of Science" was an exhibition celebrating the 50th anniversary of the Bronx High School of Science, the school which produced more Nobel laureates than any other high school in the world.
Summary
"Happy 50th Anniversary Bronx High School of Science" was an exhibition celebrating the 50th anniversary of the Bronx High School of Science, the school which produced more Nobel laureates than any other high school in the world. Featured were student projects and a video presentation on the school. The exhibit was on view in the Roosevelt Memorial Hall of the American Museum of Natural History starting in December, 1988 and continuing through January 1989.