American Museum of Natural History Research Library
author: American Museum of Natural History

Birds of Greenland (Exhibition)
birth: 1961 November 5
death: 1962 January 14
Exhibition. Opened in November 5, 1961 and closed January 14, 1962. Located in the North American Mammal Corridor at the American Museum of Natural History. "Birds of Greenland" was an exhibition of watercolors by the Danish artist, Gitz-Johansen.
Summary
"Birds of Greenland" was an exhibition of watercolors by the Danish artist, Gitz-Johansen. Among the birds depicted were the Ringed Plover, Greenland Rock-Ptarmigan, Fulmar Petrel, Pink-footed Goose, Greenland Mallard, Pintail, Ivory-Gull, Gray Sea Eagle, Gyrfalcon and the Snow Bunting. Dr. Dean Amadon, Chairman of the Museum's Department of Ornithology, pointed out that Gitz-Johansen was not a scientific observer of natural history, rather an artist who sought the personality of the bird portrayed. The exhibition was sponsored by the Embassy of Denmark and was circulated by the Smithsonian Traveling Exhibition Service. The paintings were on view in the first floor North American Mammal Corridor of the American Museum of Natural History starting November 5 1961 until January 14, 1962
Individuals and institutions involved in the creation of the exhibition: Embassy of Denmark; the Smithsonian Traveling Exhibition Service; AMNH Department of Ornithology