American Museum of Natural History Research Library
author: American Museum of Natural History

American Museum of Natural History. Gallery 1.
birth: 1983
death: 1989
Permanent exhibition. Opened April 1983 and closed approximately 1988-1989. Located on Floor 1, Section 4. Gallery 1 at the American Museum of Natural History was a space for temporary exhibits. It closed to accommodate the expansion of the Hall of Human Biology and Evolution (1, 1983-1984, p. [0]; 1, 1988-1989, p. 45).