American Museum of Natural History Research Library
author: American Museum of Natural History

American Museum of Natural History. Evelyn Miles Keller Memorial Exhibit.; Shells; Keller Memorial Shells Exhibit
birth: 1964
death: present
Permanent exhibition. Opened March 24, 1964. Located on Floor 1, Section WC. The Evelyn Miles Keller Memorial Exhibit at the American Museum of Natural History was a gift of Dr. Franklin J. Keller and consists of 200 shells collected by his wife, Evelyn Miles Keller (1, 1976). The shell exhibition shares the same corridor as Mollusks of New York State. Exhibition preparation was supervised by William K. Emerson and William E. Old, Jr of the Department of Invertebrate Zoology (2, 1963-1964, p. 39).