American Museum of Natural History Research Library
author: American Museum of Natural History

Hayden Planetarium. Meteorites and Tektites (Gallery); Meteorites; Meteorites and Tektites
birth: approximately 1990
death: 1997
Permanent exhibition. Opened approximately 1990 and closed January 5, 1997. Located on Floor 1, Section 18. The Hayden Planetarium's Meteorites and Tektites Gallery exhibited the small fragments ejected during meteorite impacts (1, 1990, 1, 1990, 2, 1997).
For additional related resources and information see Relations.