American Museum of Natural History Research Library
author: American Museum of Natural History

American Museum of Natural History. LeFrak Family Gallery.; LeFrak Family Gallery; Gallery 4
birth: 1999
death: present
Permanent exhibition. Opened November 20, 1999. Located on Floor 4, Section 20. The LeFrak Family Gallery at the American Museum of Natural History, the largest space for temporary exhibits in the Museum boasting 6,500- square feet of gallery space. Also referred to as Gallery 4, The LeFrak Family Gallery is part of the C.V. Starr Natural Science Building (1, 2000, p. 27).