American Museum of Natural History Research Library
author: American Museum of Natural History

American Museum of Natural History. Akeley Gallery.; Akeley Gallery; Akeley Corridor Gallery
birth: 1971, approximately
death: present
Permanent exhibition. Opened approximately 1971. Located on Floor 2. The Akeley Gallery at the American Museum of Natural History is used for temporary exhibits funded by continuing support from the Arthur Ross Foundation (1, 2001-2003, p. 32; 1, 1974-1975, p. 24, 31; 2, p. 2).