American Museum of Natural History Research Library
author: American Museum of Natural History

Brunflo Meteorite (Exhibition)
birth: 1987 January
death: unknown
Exhibition. Opened January 1987. Located in the Arthur Ross Hall of Meteorites at the American Museum of Natural History. The "Brunflo Meteorite" fell to earth 460 million years ago and was found in Sweden.
Summary
The "Brunflo Meteorite" fell to earth 460 million years ago and was found in Sweden. Considered then the oldest meteorite on earth, it was on view in the Arthur Ross Hall of Meteorites of the American Museum of Natural History starting in January, 1987.
Individuals and institutions involved in the creation of the exhibition: Names that turn up in the other columns