American Museum of Natural History Research Library
author: American Museum of Natural History

American Museum of Natural History. Gallery 3.
birth: 1978 May
death: present
Permanent exhibition. Opened May 1978. Located on Floor 3, Section 3. Gallery 3 at the American Museum of Natural History is a gallery space for temporary exhibits and was the largest temporary exhibition space until the opening of the LeFrak Family Gallery in 1999 (1, 1977-1978, p. [0], 20; 1978-1979, p. 49; 2000, p. 27).