American Museum of Natural History Research Library
author: American Museum of Natural History

Myers Field Trips to Central America
birth: 1979
death: 1980
To study poison frogs , and environmental impacts of a proposed dam
Ecuador in Nov., '79 and Panama in March and April, 1980
Personnel: Myers, Charles W., leader
Department: Herpetology
Sources: AMNH Annual Report No. 111, 1979-80, pp. 21-22