American Museum of Natural History Research Library
author: American Museum of Natural History

Andrews, Wilhelmina Christmas
Wilhelmina (Billie) Christmas was Roy Chapman Andrews' second wife. They were married from 1935 until his death in 1960
Worked at the American Museum of Natural History in Andrews, Roy Chapman.